\hypertarget{classBds_1_1Calibration}{}\section{Bds\+::Calibration Class Reference}
\label{classBds_1_1Calibration}\index{Bds::Calibration@{Bds::Calibration}}


This class defines a calibration setting.  




{\ttfamily \#include $<$Bds\+D.\+h$>$}

Inheritance diagram for Bds\+::Calibration\+:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=2.000000cm]{classBds_1_1Calibration}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\mbox{\hyperlink{classBds_1_1Calibration_ac5de72f46c2f73321aa88cde5fde2be5}{Calibration}} (\textbf{ B\+U\+Int32} \mbox{\hyperlink{classBds_1_1Calibration_ae560e304f4f56e0bd19d30d60aa90fea}{id}}=0, \textbf{ B\+Time\+Stamp} \mbox{\hyperlink{classBds_1_1Calibration_a5a492a746ffb33fe521d0b1bf33dfcff}{start\+Time}}=\textbf{ B\+Time\+Stamp}(), \textbf{ B\+Time\+Stamp} \mbox{\hyperlink{classBds_1_1Calibration_a759893dbc6e4f93924c6537517407e4e}{end\+Time}}=\textbf{ B\+Time\+Stamp}(), \textbf{ B\+String} \mbox{\hyperlink{classBds_1_1Calibration_a6f12335566f52c8c6a5678e5f3a8895a}{network}}=\textbf{ B\+String}(), \textbf{ B\+String} \mbox{\hyperlink{classBds_1_1Calibration_ab1584764ebba82603120dbbb128887c8}{station}}=\textbf{ B\+String}(), \textbf{ B\+String} \mbox{\hyperlink{classBds_1_1Calibration_a3787026464f0447802a400afb5504e74}{channel}}=\textbf{ B\+String}(), \textbf{ B\+String} \mbox{\hyperlink{classBds_1_1Calibration_a18e2fa06d2c20ef329fc85c40d876451}{source}}=\textbf{ B\+String}(), \textbf{ B\+String} \mbox{\hyperlink{classBds_1_1Calibration_a7ff17f4599909e2522deced168760255}{name}}=\textbf{ B\+String}(), \textbf{ B\+Float64} \mbox{\hyperlink{classBds_1_1Calibration_a7d57c20da4a6ad8921c28691168453e2}{sampling\+Frequency}}=0, \textbf{ B\+Float64} \mbox{\hyperlink{classBds_1_1Calibration_a932992bb89864de15725c2296c1ed544}{calibration\+Frequency}}=0, \textbf{ B\+Float64} \mbox{\hyperlink{classBds_1_1Calibration_a6fcbe89412006c086c1c14c18090ab86}{calibration\+Factor}}=0, \textbf{ B\+String} \mbox{\hyperlink{classBds_1_1Calibration_a8fa937a268d2e5c6157ed4f800360378}{calibration\+Units}}=\textbf{ B\+String}(), \textbf{ B\+Float64} \mbox{\hyperlink{classBds_1_1Calibration_aecc993c59072d563bca93d1c19776718}{depth}}=0, \textbf{ B\+Float64} \mbox{\hyperlink{classBds_1_1Calibration_a87b242fb4b097319580abcd2de6b3fea}{horizontal\+Angle}}=0, \textbf{ B\+Float64} \mbox{\hyperlink{classBds_1_1Calibration_ac3029cab738d3ec289244db00b61c668}{vertical\+Angle}}=0)
\item 
\textbf{ B\+String} \mbox{\hyperlink{classBds_1_1Calibration_a79106af25b53d3359951f6fefeac5792}{get\+Type}} ()
\item 
\textbf{ B\+Error} \mbox{\hyperlink{classBds_1_1Calibration_a8d222f6e1431fc0e6ca7c7c25cdc72f1}{set\+Members}} (\textbf{ B\+Dict\+String} \&members)
\item 
\textbf{ B\+Error} \mbox{\hyperlink{classBds_1_1Calibration_ab17089386c8b69287b4d0f4a3e7b5011}{set\+Member}} (\textbf{ B\+String} \mbox{\hyperlink{classBds_1_1Calibration_a7ff17f4599909e2522deced168760255}{name}}, \textbf{ B\+String} value)
\item 
\textbf{ B\+Error} \mbox{\hyperlink{classBds_1_1Calibration_ae3cf568539c0c7a44ee994fbe6d526a8}{get\+Members}} (\textbf{ B\+Dict\+String} \&members)
\item 
\textbf{ B\+Error} \mbox{\hyperlink{classBds_1_1Calibration_a1dbef9c7f0fd442b34be2ad011aa3ca2}{get\+Member}} (\textbf{ B\+String} \mbox{\hyperlink{classBds_1_1Calibration_a7ff17f4599909e2522deced168760255}{name}}, \textbf{ B\+String} \&value)
\end{DoxyCompactItemize}
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
\textbf{ B\+U\+Int32} \mbox{\hyperlink{classBds_1_1Calibration_ae560e304f4f56e0bd19d30d60aa90fea}{id}}
\begin{DoxyCompactList}\small\item\em The ID. \end{DoxyCompactList}\item 
\textbf{ B\+Time\+Stamp} \mbox{\hyperlink{classBds_1_1Calibration_a5a492a746ffb33fe521d0b1bf33dfcff}{start\+Time}}
\begin{DoxyCompactList}\small\item\em The Start Time. \end{DoxyCompactList}\item 
\textbf{ B\+Time\+Stamp} \mbox{\hyperlink{classBds_1_1Calibration_a759893dbc6e4f93924c6537517407e4e}{end\+Time}}
\begin{DoxyCompactList}\small\item\em The End Time. \end{DoxyCompactList}\item 
\textbf{ B\+String} \mbox{\hyperlink{classBds_1_1Calibration_a6f12335566f52c8c6a5678e5f3a8895a}{network}}
\begin{DoxyCompactList}\small\item\em The Network/\+Organisation Name. \end{DoxyCompactList}\item 
\textbf{ B\+String} \mbox{\hyperlink{classBds_1_1Calibration_ab1584764ebba82603120dbbb128887c8}{station}}
\begin{DoxyCompactList}\small\item\em The station. \end{DoxyCompactList}\item 
\textbf{ B\+String} \mbox{\hyperlink{classBds_1_1Calibration_a3787026464f0447802a400afb5504e74}{channel}}
\begin{DoxyCompactList}\small\item\em The channel. \end{DoxyCompactList}\item 
\textbf{ B\+String} \mbox{\hyperlink{classBds_1_1Calibration_a18e2fa06d2c20ef329fc85c40d876451}{source}}
\begin{DoxyCompactList}\small\item\em The source. \end{DoxyCompactList}\item 
\textbf{ B\+String} \mbox{\hyperlink{classBds_1_1Calibration_a7ff17f4599909e2522deced168760255}{name}}
\begin{DoxyCompactList}\small\item\em The Calibrations name, \char`\"{}\+Main\char`\"{}, \char`\"{}\+Measured\char`\"{}. \end{DoxyCompactList}\item 
\textbf{ B\+Float64} \mbox{\hyperlink{classBds_1_1Calibration_a7d57c20da4a6ad8921c28691168453e2}{sampling\+Frequency}}
\begin{DoxyCompactList}\small\item\em The sample rate used. \end{DoxyCompactList}\item 
\textbf{ B\+Float64} \mbox{\hyperlink{classBds_1_1Calibration_a932992bb89864de15725c2296c1ed544}{calibration\+Frequency}}
\begin{DoxyCompactList}\small\item\em The frequency that the Calibration\+Factor value is valid for. \end{DoxyCompactList}\item 
\textbf{ B\+Float64} \mbox{\hyperlink{classBds_1_1Calibration_a6fcbe89412006c086c1c14c18090ab86}{calibration\+Factor}}
\begin{DoxyCompactList}\small\item\em The scaling value to apply to the data to normalise data to the units. This is a measured value at the calibration frequency. \end{DoxyCompactList}\item 
\textbf{ B\+String} \mbox{\hyperlink{classBds_1_1Calibration_a8fa937a268d2e5c6157ed4f800360378}{calibration\+Units}}
\begin{DoxyCompactList}\small\item\em The measurment units. \end{DoxyCompactList}\item 
\textbf{ B\+Float64} \mbox{\hyperlink{classBds_1_1Calibration_aecc993c59072d563bca93d1c19776718}{depth}}
\begin{DoxyCompactList}\small\item\em The depth of the sensor below ground level in meters. \end{DoxyCompactList}\item 
\textbf{ B\+Float64} \mbox{\hyperlink{classBds_1_1Calibration_a87b242fb4b097319580abcd2de6b3fea}{horizontal\+Angle}}
\begin{DoxyCompactList}\small\item\em The Sensors channel placement horizontal angle in degrees clockwise from north. \end{DoxyCompactList}\item 
\textbf{ B\+Float64} \mbox{\hyperlink{classBds_1_1Calibration_ac3029cab738d3ec289244db00b61c668}{vertical\+Angle}}
\begin{DoxyCompactList}\small\item\em The Sensors channel placement vertical angle in degrees degrees with zero = vertically up. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
This class defines a calibration setting. 

\subsection{Constructor \& Destructor Documentation}
\mbox{\Hypertarget{classBds_1_1Calibration_ac5de72f46c2f73321aa88cde5fde2be5}\label{classBds_1_1Calibration_ac5de72f46c2f73321aa88cde5fde2be5}} 
\index{Bds::Calibration@{Bds::Calibration}!Calibration@{Calibration}}
\index{Calibration@{Calibration}!Bds::Calibration@{Bds::Calibration}}
\subsubsection{\texorpdfstring{Calibration()}{Calibration()}}
{\footnotesize\ttfamily Bds\+::\+Calibration\+::\+Calibration (\begin{DoxyParamCaption}\item[{\textbf{ B\+U\+Int32}}]{id = {\ttfamily 0},  }\item[{\textbf{ B\+Time\+Stamp}}]{start\+Time = {\ttfamily \textbf{ B\+Time\+Stamp}()},  }\item[{\textbf{ B\+Time\+Stamp}}]{end\+Time = {\ttfamily \textbf{ B\+Time\+Stamp}()},  }\item[{\textbf{ B\+String}}]{network = {\ttfamily \textbf{ B\+String}()},  }\item[{\textbf{ B\+String}}]{station = {\ttfamily \textbf{ B\+String}()},  }\item[{\textbf{ B\+String}}]{channel = {\ttfamily \textbf{ B\+String}()},  }\item[{\textbf{ B\+String}}]{source = {\ttfamily \textbf{ B\+String}()},  }\item[{\textbf{ B\+String}}]{name = {\ttfamily \textbf{ B\+String}()},  }\item[{\textbf{ B\+Float64}}]{sampling\+Frequency = {\ttfamily 0},  }\item[{\textbf{ B\+Float64}}]{calibration\+Frequency = {\ttfamily 0},  }\item[{\textbf{ B\+Float64}}]{calibration\+Factor = {\ttfamily 0},  }\item[{\textbf{ B\+String}}]{calibration\+Units = {\ttfamily \textbf{ B\+String}()},  }\item[{\textbf{ B\+Float64}}]{depth = {\ttfamily 0},  }\item[{\textbf{ B\+Float64}}]{horizontal\+Angle = {\ttfamily 0},  }\item[{\textbf{ B\+Float64}}]{vertical\+Angle = {\ttfamily 0} }\end{DoxyParamCaption})}



\subsection{Member Function Documentation}
\mbox{\Hypertarget{classBds_1_1Calibration_a1dbef9c7f0fd442b34be2ad011aa3ca2}\label{classBds_1_1Calibration_a1dbef9c7f0fd442b34be2ad011aa3ca2}} 
\index{Bds::Calibration@{Bds::Calibration}!getMember@{getMember}}
\index{getMember@{getMember}!Bds::Calibration@{Bds::Calibration}}
\subsubsection{\texorpdfstring{getMember()}{getMember()}}
{\footnotesize\ttfamily \textbf{ B\+Error} Bds\+::\+Calibration\+::get\+Member (\begin{DoxyParamCaption}\item[{\textbf{ B\+String}}]{name,  }\item[{\textbf{ B\+String} \&}]{value }\end{DoxyParamCaption})\hspace{0.3cm}{\ttfamily [virtual]}}



Reimplemented from \textbf{ B\+Obj}.

\mbox{\Hypertarget{classBds_1_1Calibration_ae3cf568539c0c7a44ee994fbe6d526a8}\label{classBds_1_1Calibration_ae3cf568539c0c7a44ee994fbe6d526a8}} 
\index{Bds::Calibration@{Bds::Calibration}!getMembers@{getMembers}}
\index{getMembers@{getMembers}!Bds::Calibration@{Bds::Calibration}}
\subsubsection{\texorpdfstring{getMembers()}{getMembers()}}
{\footnotesize\ttfamily \textbf{ B\+Error} Bds\+::\+Calibration\+::get\+Members (\begin{DoxyParamCaption}\item[{\textbf{ B\+Dict\+String} \&}]{members }\end{DoxyParamCaption})\hspace{0.3cm}{\ttfamily [virtual]}}



Reimplemented from \textbf{ B\+Obj}.

\mbox{\Hypertarget{classBds_1_1Calibration_a79106af25b53d3359951f6fefeac5792}\label{classBds_1_1Calibration_a79106af25b53d3359951f6fefeac5792}} 
\index{Bds::Calibration@{Bds::Calibration}!getType@{getType}}
\index{getType@{getType}!Bds::Calibration@{Bds::Calibration}}
\subsubsection{\texorpdfstring{getType()}{getType()}}
{\footnotesize\ttfamily \textbf{ B\+String} Bds\+::\+Calibration\+::get\+Type (\begin{DoxyParamCaption}{ }\end{DoxyParamCaption})}

\mbox{\Hypertarget{classBds_1_1Calibration_ab17089386c8b69287b4d0f4a3e7b5011}\label{classBds_1_1Calibration_ab17089386c8b69287b4d0f4a3e7b5011}} 
\index{Bds::Calibration@{Bds::Calibration}!setMember@{setMember}}
\index{setMember@{setMember}!Bds::Calibration@{Bds::Calibration}}
\subsubsection{\texorpdfstring{setMember()}{setMember()}}
{\footnotesize\ttfamily \textbf{ B\+Error} Bds\+::\+Calibration\+::set\+Member (\begin{DoxyParamCaption}\item[{\textbf{ B\+String}}]{name,  }\item[{\textbf{ B\+String}}]{value }\end{DoxyParamCaption})\hspace{0.3cm}{\ttfamily [virtual]}}



Reimplemented from \textbf{ B\+Obj}.

\mbox{\Hypertarget{classBds_1_1Calibration_a8d222f6e1431fc0e6ca7c7c25cdc72f1}\label{classBds_1_1Calibration_a8d222f6e1431fc0e6ca7c7c25cdc72f1}} 
\index{Bds::Calibration@{Bds::Calibration}!setMembers@{setMembers}}
\index{setMembers@{setMembers}!Bds::Calibration@{Bds::Calibration}}
\subsubsection{\texorpdfstring{setMembers()}{setMembers()}}
{\footnotesize\ttfamily \textbf{ B\+Error} Bds\+::\+Calibration\+::set\+Members (\begin{DoxyParamCaption}\item[{\textbf{ B\+Dict\+String} \&}]{members }\end{DoxyParamCaption})\hspace{0.3cm}{\ttfamily [virtual]}}



Reimplemented from \textbf{ B\+Obj}.



\subsection{Member Data Documentation}
\mbox{\Hypertarget{classBds_1_1Calibration_a6fcbe89412006c086c1c14c18090ab86}\label{classBds_1_1Calibration_a6fcbe89412006c086c1c14c18090ab86}} 
\index{Bds::Calibration@{Bds::Calibration}!calibrationFactor@{calibrationFactor}}
\index{calibrationFactor@{calibrationFactor}!Bds::Calibration@{Bds::Calibration}}
\subsubsection{\texorpdfstring{calibrationFactor}{calibrationFactor}}
{\footnotesize\ttfamily \textbf{ B\+Float64} Bds\+::\+Calibration\+::calibration\+Factor}



The scaling value to apply to the data to normalise data to the units. This is a measured value at the calibration frequency. 

\mbox{\Hypertarget{classBds_1_1Calibration_a932992bb89864de15725c2296c1ed544}\label{classBds_1_1Calibration_a932992bb89864de15725c2296c1ed544}} 
\index{Bds::Calibration@{Bds::Calibration}!calibrationFrequency@{calibrationFrequency}}
\index{calibrationFrequency@{calibrationFrequency}!Bds::Calibration@{Bds::Calibration}}
\subsubsection{\texorpdfstring{calibrationFrequency}{calibrationFrequency}}
{\footnotesize\ttfamily \textbf{ B\+Float64} Bds\+::\+Calibration\+::calibration\+Frequency}



The frequency that the Calibration\+Factor value is valid for. 

\mbox{\Hypertarget{classBds_1_1Calibration_a8fa937a268d2e5c6157ed4f800360378}\label{classBds_1_1Calibration_a8fa937a268d2e5c6157ed4f800360378}} 
\index{Bds::Calibration@{Bds::Calibration}!calibrationUnits@{calibrationUnits}}
\index{calibrationUnits@{calibrationUnits}!Bds::Calibration@{Bds::Calibration}}
\subsubsection{\texorpdfstring{calibrationUnits}{calibrationUnits}}
{\footnotesize\ttfamily \textbf{ B\+String} Bds\+::\+Calibration\+::calibration\+Units}



The measurment units. 

\mbox{\Hypertarget{classBds_1_1Calibration_a3787026464f0447802a400afb5504e74}\label{classBds_1_1Calibration_a3787026464f0447802a400afb5504e74}} 
\index{Bds::Calibration@{Bds::Calibration}!channel@{channel}}
\index{channel@{channel}!Bds::Calibration@{Bds::Calibration}}
\subsubsection{\texorpdfstring{channel}{channel}}
{\footnotesize\ttfamily \textbf{ B\+String} Bds\+::\+Calibration\+::channel}



The channel. 

\mbox{\Hypertarget{classBds_1_1Calibration_aecc993c59072d563bca93d1c19776718}\label{classBds_1_1Calibration_aecc993c59072d563bca93d1c19776718}} 
\index{Bds::Calibration@{Bds::Calibration}!depth@{depth}}
\index{depth@{depth}!Bds::Calibration@{Bds::Calibration}}
\subsubsection{\texorpdfstring{depth}{depth}}
{\footnotesize\ttfamily \textbf{ B\+Float64} Bds\+::\+Calibration\+::depth}



The depth of the sensor below ground level in meters. 

\mbox{\Hypertarget{classBds_1_1Calibration_a759893dbc6e4f93924c6537517407e4e}\label{classBds_1_1Calibration_a759893dbc6e4f93924c6537517407e4e}} 
\index{Bds::Calibration@{Bds::Calibration}!endTime@{endTime}}
\index{endTime@{endTime}!Bds::Calibration@{Bds::Calibration}}
\subsubsection{\texorpdfstring{endTime}{endTime}}
{\footnotesize\ttfamily \textbf{ B\+Time\+Stamp} Bds\+::\+Calibration\+::end\+Time}



The End Time. 

\mbox{\Hypertarget{classBds_1_1Calibration_a87b242fb4b097319580abcd2de6b3fea}\label{classBds_1_1Calibration_a87b242fb4b097319580abcd2de6b3fea}} 
\index{Bds::Calibration@{Bds::Calibration}!horizontalAngle@{horizontalAngle}}
\index{horizontalAngle@{horizontalAngle}!Bds::Calibration@{Bds::Calibration}}
\subsubsection{\texorpdfstring{horizontalAngle}{horizontalAngle}}
{\footnotesize\ttfamily \textbf{ B\+Float64} Bds\+::\+Calibration\+::horizontal\+Angle}



The Sensors channel placement horizontal angle in degrees clockwise from north. 

\mbox{\Hypertarget{classBds_1_1Calibration_ae560e304f4f56e0bd19d30d60aa90fea}\label{classBds_1_1Calibration_ae560e304f4f56e0bd19d30d60aa90fea}} 
\index{Bds::Calibration@{Bds::Calibration}!id@{id}}
\index{id@{id}!Bds::Calibration@{Bds::Calibration}}
\subsubsection{\texorpdfstring{id}{id}}
{\footnotesize\ttfamily \textbf{ B\+U\+Int32} Bds\+::\+Calibration\+::id}



The ID. 

\mbox{\Hypertarget{classBds_1_1Calibration_a7ff17f4599909e2522deced168760255}\label{classBds_1_1Calibration_a7ff17f4599909e2522deced168760255}} 
\index{Bds::Calibration@{Bds::Calibration}!name@{name}}
\index{name@{name}!Bds::Calibration@{Bds::Calibration}}
\subsubsection{\texorpdfstring{name}{name}}
{\footnotesize\ttfamily \textbf{ B\+String} Bds\+::\+Calibration\+::name}



The Calibrations name, \char`\"{}\+Main\char`\"{}, \char`\"{}\+Measured\char`\"{}. 

\mbox{\Hypertarget{classBds_1_1Calibration_a6f12335566f52c8c6a5678e5f3a8895a}\label{classBds_1_1Calibration_a6f12335566f52c8c6a5678e5f3a8895a}} 
\index{Bds::Calibration@{Bds::Calibration}!network@{network}}
\index{network@{network}!Bds::Calibration@{Bds::Calibration}}
\subsubsection{\texorpdfstring{network}{network}}
{\footnotesize\ttfamily \textbf{ B\+String} Bds\+::\+Calibration\+::network}



The Network/\+Organisation Name. 

\mbox{\Hypertarget{classBds_1_1Calibration_a7d57c20da4a6ad8921c28691168453e2}\label{classBds_1_1Calibration_a7d57c20da4a6ad8921c28691168453e2}} 
\index{Bds::Calibration@{Bds::Calibration}!samplingFrequency@{samplingFrequency}}
\index{samplingFrequency@{samplingFrequency}!Bds::Calibration@{Bds::Calibration}}
\subsubsection{\texorpdfstring{samplingFrequency}{samplingFrequency}}
{\footnotesize\ttfamily \textbf{ B\+Float64} Bds\+::\+Calibration\+::sampling\+Frequency}



The sample rate used. 

\mbox{\Hypertarget{classBds_1_1Calibration_a18e2fa06d2c20ef329fc85c40d876451}\label{classBds_1_1Calibration_a18e2fa06d2c20ef329fc85c40d876451}} 
\index{Bds::Calibration@{Bds::Calibration}!source@{source}}
\index{source@{source}!Bds::Calibration@{Bds::Calibration}}
\subsubsection{\texorpdfstring{source}{source}}
{\footnotesize\ttfamily \textbf{ B\+String} Bds\+::\+Calibration\+::source}



The source. 

\mbox{\Hypertarget{classBds_1_1Calibration_a5a492a746ffb33fe521d0b1bf33dfcff}\label{classBds_1_1Calibration_a5a492a746ffb33fe521d0b1bf33dfcff}} 
\index{Bds::Calibration@{Bds::Calibration}!startTime@{startTime}}
\index{startTime@{startTime}!Bds::Calibration@{Bds::Calibration}}
\subsubsection{\texorpdfstring{startTime}{startTime}}
{\footnotesize\ttfamily \textbf{ B\+Time\+Stamp} Bds\+::\+Calibration\+::start\+Time}



The Start Time. 

\mbox{\Hypertarget{classBds_1_1Calibration_ab1584764ebba82603120dbbb128887c8}\label{classBds_1_1Calibration_ab1584764ebba82603120dbbb128887c8}} 
\index{Bds::Calibration@{Bds::Calibration}!station@{station}}
\index{station@{station}!Bds::Calibration@{Bds::Calibration}}
\subsubsection{\texorpdfstring{station}{station}}
{\footnotesize\ttfamily \textbf{ B\+String} Bds\+::\+Calibration\+::station}



The station. 

\mbox{\Hypertarget{classBds_1_1Calibration_ac3029cab738d3ec289244db00b61c668}\label{classBds_1_1Calibration_ac3029cab738d3ec289244db00b61c668}} 
\index{Bds::Calibration@{Bds::Calibration}!verticalAngle@{verticalAngle}}
\index{verticalAngle@{verticalAngle}!Bds::Calibration@{Bds::Calibration}}
\subsubsection{\texorpdfstring{verticalAngle}{verticalAngle}}
{\footnotesize\ttfamily \textbf{ B\+Float64} Bds\+::\+Calibration\+::vertical\+Angle}



The Sensors channel placement vertical angle in degrees degrees with zero = vertically up. 



The documentation for this class was generated from the following files\+:\begin{DoxyCompactItemize}
\item 
\mbox{\hyperlink{BdsD_8h}{Bds\+D.\+h}}\item 
\mbox{\hyperlink{BdsD_8cc}{Bds\+D.\+cc}}\end{DoxyCompactItemize}
